-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.185106594413
cusum  =  0.11668748691
eta  =  0.780487884264
hl_amp_ratio  =  1.11141088063
kurtosis  =  -0.525024039726
n_points  =  310
period  =  0.645843737785
period_SNR  =  41.0064796813
period_log10FAP  =  -32.3603413145
period_uncertainty  =  0.000143435838682
phase_cusum  =  0.231899442225
phase_eta  =  0.524467551414
phi21  =  1.23374947042
phi31  =  2.55300208611
quartile31  =  0.26
r21  =  0.403190717002
r31  =  0.291230483578
shapiro_w  =  0.990381896496
skewness  =  0.0735122499939
slope_per10  =  -0.152311724745
slope_per90  =  0.145904278618
stetson_k  =  0.817091377213
weighted_mean  =  15.8824630604
weighted_std  =  0.171241413253
