-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.258140665467
cusum  =  0.113935435315
eta  =  0.592052631277
hl_amp_ratio  =  0.513361554553
kurtosis  =  -0.850306191285
n_points  =  287
period  =  0.607783741208
period_SNR  =  45.0897293901
period_log10FAP  =  -38.1239256005
period_uncertainty  =  0.000105826674832
phase_cusum  =  0.300498416344
phase_eta  =  0.0845303748977
phi21  =  4.31323688674
phi31  =  5.81472787808
quartile31  =  0.34
r21  =  0.47314644199
r31  =  0.306788441217
shapiro_w  =  0.953778862953
skewness  =  -0.414239783715
slope_per10  =  -0.205378521212
slope_per90  =  0.301369844605
stetson_k  =  0.804779915373
weighted_mean  =  15.0762431174
weighted_std  =  0.212715627414
