-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.81


######### Lightcurve features #########

amplitude  =  0.389514103391
cusum  =  0.140740430347
eta  =  0.514060002653
hl_amp_ratio  =  0.373875390658
kurtosis  =  -1.10006972562
n_points  =  307
period  =  0.563060359494
period_SNR  =  49.3170838379
period_log10FAP  =  -43.0214663592
period_uncertainty  =  0.000109021630425
phase_cusum  =  0.260718609493
phase_eta  =  0.0637416971526
phi21  =  -2.04027109907
phi31  =  -4.26160711302
quartile31  =  0.66
r21  =  0.5341612088
r31  =  0.320398683087
shapiro_w  =  0.885792434216
skewness  =  -0.587668464525
slope_per10  =  -0.178473579974
slope_per90  =  0.185479373345
stetson_k  =  0.742957689313
weighted_mean  =  15.7837896221
weighted_std  =  0.379445341624
