-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.2403225825
cusum  =  0.125796959149
eta  =  0.569520802757
hl_amp_ratio  =  0.545334835462
kurtosis  =  -0.790554796559
n_points  =  284
period  =  0.761665954791
period_SNR  =  42.0701708855
period_log10FAP  =  -37.1262212711
period_uncertainty  =  0.000265852021571
phase_cusum  =  0.267241803844
phase_eta  =  0.244879343621
phi21  =  4.28298634737
phi31  =  5.66385016638
quartile31  =  0.32
r21  =  0.472287423169
r31  =  0.252180950631
shapiro_w  =  0.934200644493
skewness  =  -0.549116477471
slope_per10  =  -0.163533334465
slope_per90  =  0.375826112405
stetson_k  =  0.793887162329
weighted_mean  =  14.7917462871
weighted_std  =  0.203425380122
