-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.296115062778
cusum  =  0.232747120814
eta  =  0.60864449267
hl_amp_ratio  =  0.281864770737
kurtosis  =  -0.0509344886604
n_points  =  287
period  =  0.595588343684
period_SNR  =  51.6060385784
period_log10FAP  =  -40.1074932057
period_uncertainty  =  0.000101608496029
phase_cusum  =  0.194950107238
phase_eta  =  0.16891078771
phi21  =  0.696744184125
phi31  =  1.47137040393
quartile31  =  0.295
r21  =  0.359245349494
r31  =  0.218381191918
shapiro_w  =  0.883364021778
skewness  =  -0.982892135553
slope_per10  =  -0.161605079006
slope_per90  =  0.204357260904
stetson_k  =  0.673531376686
weighted_mean  =  15.9972410982
weighted_std  =  0.244106278822
