-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.290471367744
cusum  =  0.147535205134
eta  =  0.566032868953
hl_amp_ratio  =  0.325047684692
kurtosis  =  -0.147216589733
n_points  =  283
period  =  0.609524147227
period_SNR  =  45.4049230624
period_log10FAP  =  -39.2317419931
period_uncertainty  =  0.000170305725575
phase_cusum  =  0.261278695534
phase_eta  =  0.265231145532
phi21  =  0.631812355716
phi31  =  -1.65306122683
quartile31  =  0.33
r21  =  0.358353427843
r31  =  0.191112775065
shapiro_w  =  0.896403431892
skewness  =  -0.920914032741
slope_per10  =  -0.152764917649
slope_per90  =  0.127530852626
stetson_k  =  0.715871662622
weighted_mean  =  14.7660760455
weighted_std  =  0.227267210565
