-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.263223693751
cusum  =  0.0988505206916
eta  =  0.681850869722
hl_amp_ratio  =  0.431673755392
kurtosis  =  -1.27414197624
n_points  =  286
period  =  0.551271080159
period_SNR  =  45.6995612775
period_log10FAP  =  -40.3592309357
period_uncertainty  =  0.000104466761409
phase_cusum  =  0.253274052482
phase_eta  =  0.0502844202804
phi21  =  0.919136793772
phi31  =  -1.01631635026
quartile31  =  0.43
r21  =  0.464956384998
r31  =  0.358760102886
shapiro_w  =  0.911160111427
skewness  =  -0.384737696276
slope_per10  =  -0.148420368071
slope_per90  =  0.331200000364
stetson_k  =  0.814706233598
weighted_mean  =  14.0801494223
weighted_std  =  0.234519555012
