-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.260615322114
cusum  =  0.0842928741131
eta  =  0.585658251785
hl_amp_ratio  =  0.54707134814
kurtosis  =  -0.439592762761
n_points  =  290
period  =  0.709922825999
period_SNR  =  43.5893490535
period_log10FAP  =  -36.0362817381
period_uncertainty  =  0.000231075883275
phase_cusum  =  0.250114255376
phase_eta  =  0.286076743437
phi21  =  1.1843294473
phi31  =  2.5381070989
quartile31  =  0.31
r21  =  0.495601762878
r31  =  0.276282294348
shapiro_w  =  0.949298262596
skewness  =  -0.605701408079
slope_per10  =  -0.181347435267
slope_per90  =  0.331610956395
stetson_k  =  0.768892765832
weighted_mean  =  15.1739223072
weighted_std  =  0.207102476056
