-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.336664278375
cusum  =  0.110956429086
eta  =  0.558995148704
hl_amp_ratio  =  0.572980459582
kurtosis  =  -0.576503047333
n_points  =  301
period  =  0.492782870287
period_SNR  =  42.2372749672
period_log10FAP  =  -36.1600697733
period_uncertainty  =  0.000111250230011
phase_cusum  =  0.267811888499
phase_eta  =  0.17810045183
phi21  =  4.03063752978
phi31  =  5.27259712381
quartile31  =  0.43
r21  =  0.451584764095
r31  =  0.347208401249
shapiro_w  =  0.944567680359
skewness  =  -0.584678167291
slope_per10  =  -0.133060400747
slope_per90  =  0.122672899946
stetson_k  =  0.799296666315
weighted_mean  =  14.6709615665
weighted_std  =  0.297462221594
