-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.250584629857
cusum  =  0.0846616892555
eta  =  0.680503068746
hl_amp_ratio  =  0.514674732875
kurtosis  =  -0.615813716484
n_points  =  289
period  =  0.516004015846
period_SNR  =  37.5465618957
period_log10FAP  =  -31.3251226393
period_uncertainty  =  0.000122022830127
phase_cusum  =  0.298854752987
phase_eta  =  0.236805068204
phi21  =  0.798233147258
phi31  =  -1.00643585969
quartile31  =  0.31
r21  =  0.51140610552
r31  =  0.326756861265
shapiro_w  =  0.95015591383
skewness  =  -0.566263336946
slope_per10  =  -0.141854867925
slope_per90  =  0.123967791368
stetson_k  =  0.77925754605
weighted_mean  =  15.3300534245
weighted_std  =  0.209499688908
