-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.177694647333
cusum  =  0.107868072875
eta  =  0.600198290044
hl_amp_ratio  =  0.590710162844
kurtosis  =  -0.209073549151
n_points  =  338
period  =  0.77877097357
period_SNR  =  31.8303933793
period_log10FAP  =  -32.6467536527
period_uncertainty  =  0.000195409256257
phase_cusum  =  0.216226515477
phase_eta  =  0.381391224659
phi21  =  -1.70901125835
phi31  =  -0.605060598452
quartile31  =  0.24
r21  =  0.566588170836
r31  =  0.439799543288
shapiro_w  =  0.959232270718
skewness  =  -0.524054462515
slope_per10  =  -0.319578443549
slope_per90  =  0.247173850504
stetson_k  =  0.775075000989
weighted_mean  =  13.0840940594
weighted_std  =  0.173324856856
