-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.301369712692
cusum  =  0.101410938149
eta  =  0.493811938477
hl_amp_ratio  =  0.341610332593
kurtosis  =  -0.484340923726
n_points  =  349
period  =  0.620710268309
period_SNR  =  39.6545665816
period_log10FAP  =  -43.1142508534
period_uncertainty  =  0.000103320841071
phase_cusum  =  0.282340697939
phase_eta  =  0.312539915416
phi21  =  1.05086397427
phi31  =  2.15510276933
quartile31  =  0.39
r21  =  0.437791412076
r31  =  0.274236651696
shapiro_w  =  0.916397690773
skewness  =  -0.725924362131
slope_per10  =  -0.10940791451
slope_per90  =  0.230342951262
stetson_k  =  0.759311916388
weighted_mean  =  13.7767515759
weighted_std  =  0.257374540195
