-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.313711675911
cusum  =  0.140538517125
eta  =  0.483507246679
hl_amp_ratio  =  0.437402483511
kurtosis  =  -0.667908998062
n_points  =  280
period  =  0.536764166043
period_SNR  =  34.1439103344
period_log10FAP  =  -35.7752609991
period_uncertainty  =  0.000108181195637
phase_cusum  =  0.23553315836
phase_eta  =  0.084697659664
phi21  =  4.01320329287
phi31  =  5.22656394178
quartile31  =  0.3925
r21  =  0.532407919919
r31  =  0.32039475032
shapiro_w  =  0.92580896616
skewness  =  -0.650834372244
slope_per10  =  -0.177841975965
slope_per90  =  0.259200003929
stetson_k  =  0.782837444905
weighted_mean  =  15.0857999201
weighted_std  =  0.266714145714
