-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.165076961545
cusum  =  0.112014900398
eta  =  0.559726543324
hl_amp_ratio  =  0.741133557456
kurtosis  =  -1.13696905431
n_points  =  279
period  =  0.633704241436
period_SNR  =  34.3617073162
period_log10FAP  =  -36.8611185026
period_uncertainty  =  0.000107692247129
phase_cusum  =  0.244605794831
phase_eta  =  0.356304386311
phi21  =  3.91843439397
phi31  =  5.2869117688
quartile31  =  0.23
r21  =  0.345781003276
r31  =  0.153932173305
shapiro_w  =  0.959018826485
skewness  =  -0.118051744499
slope_per10  =  -0.126653920343
slope_per90  =  0.450662309235
stetson_k  =  0.858912887527
weighted_mean  =  13.8988215954
weighted_std  =  0.130751534774
