-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.254383817533
cusum  =  0.1161154753
eta  =  0.62163281691
hl_amp_ratio  =  0.623776425729
kurtosis  =  -0.591635959949
n_points  =  340
period  =  0.748170812375
period_SNR  =  40.7247448479
period_log10FAP  =  -42.6368605586
period_uncertainty  =  0.000150307546079
phase_cusum  =  0.225600938396
phase_eta  =  0.216738554531
phi21  =  1.10618111425
phi31  =  -0.829048516794
quartile31  =  0.3
r21  =  0.497313660768
r31  =  0.272191085576
shapiro_w  =  0.953887045383
skewness  =  -0.402212087629
slope_per10  =  -0.208267124233
slope_per90  =  0.352764995216
stetson_k  =  0.806361949749
weighted_mean  =  14.6783846344
weighted_std  =  0.204469498877
