<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.304531623226
cusum  =  0.0987296529363
eta  =  0.676253988381
hl_amp_ratio  =  0.835415041359
kurtosis  =  -0.460228337327
n_points  =  327
period  =  0.64682811886
period_SNR  =  33.4354265361
period_log10FAP  =  -32.0324709985
period_uncertainty  =  0.000112672125436
phase_cusum  =  0.241986402497
phase_eta  =  0.636089638945
phi21  =  4.25544252664
phi31  =  5.58747644802
quartile31  =  0.46
r21  =  0.426165365448
r31  =  0.169944654249
shapiro_w  =  0.981346011162
skewness  =  -0.144799444207
slope_per10  =  -0.0728048111074
slope_per90  =  0.0963733227139
stetson_k  =  0.817289042727
weighted_mean  =  17.4390911892
weighted_std  =  0.30149547923
</pre></body></html>