-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.268948535583
cusum  =  0.124827165814
eta  =  0.521971237304
hl_amp_ratio  =  0.677497617416
kurtosis  =  -1.10050582306
n_points  =  345
period  =  0.627419341083
period_SNR  =  44.3631630157
period_log10FAP  =  -51.0540146532
period_uncertainty  =  0.000127205386269
phase_cusum  =  0.251258698077
phase_eta  =  0.13486365812
phi21  =  0.976864833145
phi31  =  -1.09871508795
quartile31  =  0.43
r21  =  0.346318552744
r31  =  0.311665490187
shapiro_w  =  0.930649995804
skewness  =  -0.365161326362
slope_per10  =  -0.188416671396
slope_per90  =  0.223609846867
stetson_k  =  0.839695814553
weighted_mean  =  15.9555235044
weighted_std  =  0.245810456408
