-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.201935179479
cusum  =  0.149594697754
eta  =  0.785929484459
hl_amp_ratio  =  0.7530951723
kurtosis  =  -0.748983375221
n_points  =  382
period  =  0.619921895703
period_SNR  =  42.7131402237
period_log10FAP  =  -44.726559655
period_uncertainty  =  0.000103093512965
phase_cusum  =  0.250343008552
phase_eta  =  0.609137780465
phi21  =  1.1854193143
phi31  =  -0.263772482535
quartile31  =  0.295
r21  =  0.384138426165
r31  =  0.221767835729
shapiro_w  =  0.983289241791
skewness  =  -0.018076657137
slope_per10  =  -0.0693848965177
slope_per90  =  0.0759265273476
stetson_k  =  0.82016302926
weighted_mean  =  17.4610605503
weighted_std  =  0.182767019823
