-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.143311652986
cusum  =  0.140699419329
eta  =  0.604705899836
hl_amp_ratio  =  0.935332114119
kurtosis  =  0.0965871778318
n_points  =  407
period  =  0.6462283858
period_SNR  =  35.4430554742
period_log10FAP  =  -36.312881088
period_uncertainty  =  0.000112029055621
phase_cusum  =  0.245027538538
phase_eta  =  0.815982258635
phi21  =  1.18026975696
phi31  =  2.6358542027
quartile31  =  0.21
r21  =  0.460945911393
r31  =  0.286997394918
shapiro_w  =  0.987523019314
skewness  =  0.0689061600937
slope_per10  =  -0.113750524564
slope_per90  =  0.114833330736
stetson_k  =  0.782071813012
weighted_mean  =  16.1613866076
weighted_std  =  0.153472374103
