-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.320952629749
cusum  =  0.191980534537
eta  =  0.495214220773
hl_amp_ratio  =  0.56697470046
kurtosis  =  -1.23916230434
n_points  =  344
period  =  0.621783026219
period_SNR  =  37.3176446824
period_log10FAP  =  -42.0905410639
period_uncertainty  =  0.00010371347792
phase_cusum  =  0.285371782678
phase_eta  =  0.0691216900438
phi21  =  0.911835543125
phi31  =  -0.916664261869
quartile31  =  0.5425
r21  =  0.548071901614
r31  =  0.363832067422
shapiro_w  =  0.922794938087
skewness  =  -0.330572265325
slope_per10  =  -0.148876930841
slope_per90  =  0.172640888486
stetson_k  =  0.822542447663
weighted_mean  =  16.0425321564
weighted_std  =  0.317713203045
