-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.152283082792
cusum  =  0.175850761832
eta  =  0.802408784706
hl_amp_ratio  =  0.753576661268
kurtosis  =  -0.892273106995
n_points  =  374
period  =  0.640851659905
period_SNR  =  42.2354286285
period_log10FAP  =  -42.716564048
period_uncertainty  =  0.000110172548151
phase_cusum  =  0.227181960216
phase_eta  =  0.496378668902
phi21  =  1.11446312022
phi31  =  1.95215534185
quartile31  =  0.27
r21  =  0.505476016468
r31  =  0.199202195889
shapiro_w  =  0.974020600319
skewness  =  -0.0708121268687
slope_per10  =  -0.0968053341509
slope_per90  =  0.135186667244
stetson_k  =  0.834584749471
weighted_mean  =  16.9111763828
weighted_std  =  0.156083209523
