-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.37956246797
cusum  =  0.147605682231
eta  =  0.499932766967
hl_amp_ratio  =  0.562161938278
kurtosis  =  -0.388844291763
n_points  =  335
period  =  0.635185878784
period_SNR  =  31.1310058406
period_log10FAP  =  -39.2852193841
period_uncertainty  =  0.000108253101182
phase_cusum  =  0.271828020187
phase_eta  =  0.148261922387
phi21  =  -2.15141565364
phi31  =  -4.28856175478
quartile31  =  0.56
r21  =  0.491375537122
r31  =  0.360382845426
shapiro_w  =  0.923453688622
skewness  =  -0.693730080248
slope_per10  =  -0.0981857148664
slope_per90  =  0.188664008068
stetson_k  =  0.821386314437
weighted_mean  =  12.5407796102
weighted_std  =  0.354949006908
