-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.43


######### Lightcurve features #########

amplitude  =  0.159944064348
cusum  =  0.289523907245
eta  =  0.285877444513
hl_amp_ratio  =  0.596728166211
kurtosis  =  -0.957078865846
n_points  =  92
period  =  0.189749764703
period_SNR  =  10.9338844806
period_log10FAP  =  -8.07547816169
period_uncertainty  =  8.02290664424e-06
phase_cusum  =  0.336458323187
phase_eta  =  0.699617560999
phi21  =  1.66998926883
phi31  =  2.53017592392
quartile31  =  0.225
r21  =  0.193511599283
r31  =  0.302524083914
shapiro_w  =  0.925104856491
skewness  =  -0.451853986245
slope_per10  =  -0.18286996156
slope_per90  =  0.199099988677
stetson_k  =  0.856223803108
weighted_mean  =  11.7756521739
weighted_std  =  0.149224840191
