-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  EB_EC
class_probability =  0.22


######### Lightcurve features #########

amplitude  =  0.657535927161
cusum  =  0.246101774346
eta  =  1.78438898098
hl_amp_ratio  =  2.22585509504
kurtosis  =  -0.979753283034
n_points  =  173
period  =  2.52937732337
period_SNR  =  13.7100856827
period_log10FAP  =  -5.93250684627
period_uncertainty  =  0.00137466199482
phase_cusum  =  0.205592623018
phase_eta  =  1.62151342279
phi21  =  0.859471276605
phi31  =  3.16779990676
quartile31  =  1.47
r21  =  0.241779013413
r31  =  0.245232098354
shapiro_w  =  0.890344440937
skewness  =  0.604733311549
slope_per10  =  -0.042970238442
slope_per90  =  0.332850001287
stetson_k  =  0.806789314073
weighted_mean  =  14.9715783211
weighted_std  =  0.716621644288
