-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.33


######### Lightcurve features #########

amplitude  =  0.555843797683
cusum  =  0.271868993456
eta  =  0.785940695322
hl_amp_ratio  =  0.759493691539
kurtosis  =  -1.37651036343
n_points  =  22
period  =  0.216698620229
period_SNR  =  5.52177862273
period_log10FAP  =  -0.000378633051181
period_uncertainty  =  1.99795889794e-05
phase_cusum  =  0.348311972746
phase_eta  =  0.882463041115
phi21  =  -2.38983677808
phi31  =  -0.650927815362
quartile31  =  0.82
r21  =  0.300160345017
r31  =  0.255387785757
shapiro_w  =  0.897196888924
skewness  =  -0.312536135436
slope_per10  =  -0.198749999981
slope_per90  =  0.212666671723
stetson_k  =  0.878559686917
weighted_mean  =  13.3335344828
weighted_std  =  0.449143349957
