-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.4


######### Lightcurve features #########

amplitude  =  0.208027027873
cusum  =  0.160344208786
eta  =  0.644650731209
hl_amp_ratio  =  1.81790192162
kurtosis  =  -1.03270113494
n_points  =  202
period  =  0.599434380009
period_SNR  =  26.9532894328
period_log10FAP  =  -26.1307354205
period_uncertainty  =  0.000113314631488
phase_cusum  =  0.26854807713
phase_eta  =  0.447637354037
phi21  =  -1.05363049713
phi31  =  1.1821924738
quartile31  =  0.2875
r21  =  0.217926477323
r31  =  0.202672772301
shapiro_w  =  0.952209055424
skewness  =  0.210296068745
slope_per10  =  -0.17834424709
slope_per90  =  0.212323387206
stetson_k  =  0.816910910684
weighted_mean  =  11.5459405941
weighted_std  =  0.18290655634
