-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.28


######### Lightcurve features #########

amplitude  =  0.0229917908696
cusum  =  0.171748109058
eta  =  2.11769512129
hl_amp_ratio  =  1.26689064681
kurtosis  =  0.16122392508
n_points  =  47
period  =  0.232850402251
period_SNR  =  7.7835460463
period_log10FAP  =  0.0
period_uncertainty  =  2.53981680749e-05
phase_cusum  =  0.279371924123
phase_eta  =  1.36939295829
phi21  =  -1.20092262809
phi31  =  -0.627349169385
quartile31  =  0.03
r21  =  0.115597530114
r31  =  0.106579665184
shapiro_w  =  0.962674379349
skewness  =  -0.300105017913
slope_per10  =  -0.308999396561
slope_per90  =  0.607599997893
stetson_k  =  0.760421395909
weighted_mean  =  15.6229738562
weighted_std  =  0.0241044697161
