-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.454110170613
cusum  =  0.136686980923
eta  =  0.585026962527
hl_amp_ratio  =  0.471129854635
kurtosis  =  -0.74772976416
n_points  =  281
period  =  0.554840230701
period_SNR  =  39.9904396512
period_log10FAP  =  -35.0971163107
period_uncertainty  =  0.000140643919931
phase_cusum  =  0.302733304784
phase_eta  =  0.0554186200059
phi21  =  -2.40867141662
phi31  =  -4.4430870462
quartile31  =  0.61
r21  =  0.516330784744
r31  =  0.322079687896
shapiro_w  =  0.923767268658
skewness  =  -0.62316992715
slope_per10  =  -0.199241214477
slope_per90  =  0.220564322103
stetson_k  =  0.782389904051
weighted_mean  =  12.7708265493
weighted_std  =  0.39311328446
