-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.21810645646
cusum  =  0.131200624287
eta  =  0.697012333142
hl_amp_ratio  =  0.691354181871
kurtosis  =  -1.03576873282
n_points  =  310
period  =  0.596435168524
period_SNR  =  47.6090003834
period_log10FAP  =  -42.3636783576
period_uncertainty  =  0.000122328951996
phase_cusum  =  0.240235446518
phase_eta  =  0.0870569358688
phi21  =  1.17099299751
phi31  =  -0.685343596764
quartile31  =  0.3
r21  =  0.473744641866
r31  =  0.310743562083
shapiro_w  =  0.95403200388
skewness  =  -0.296443176198
slope_per10  =  -0.256782472188
slope_per90  =  0.235638290691
stetson_k  =  0.848111679365
weighted_mean  =  13.7677301522
weighted_std  =  0.180404408819
