-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.236810101052
cusum  =  0.150387972302
eta  =  0.548018810999
hl_amp_ratio  =  0.347197575622
kurtosis  =  0.0870485222557
n_points  =  302
period  =  0.694334344193
period_SNR  =  28.0067447701
period_log10FAP  =  -27.4026130283
period_uncertainty  =  0.000134311043241
phase_cusum  =  0.210014317949
phase_eta  =  0.329875817539
phi21  =  -2.28617903255
phi31  =  -1.34692050618
quartile31  =  0.19
r21  =  0.498467961965
r31  =  0.191460631267
shapiro_w  =  0.872505784035
skewness  =  -1.04777598067
slope_per10  =  -0.243210563363
slope_per90  =  0.182530529907
stetson_k  =  0.664377984162
weighted_mean  =  16.1967291276
weighted_std  =  0.196719970459
