-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.81


######### Lightcurve features #########

amplitude  =  0.291983553495
cusum  =  0.172348581899
eta  =  0.476649994105
hl_amp_ratio  =  0.609879986725
kurtosis  =  -0.973039321746
n_points  =  239
period  =  0.826362939268
period_SNR  =  32.2984790024
period_log10FAP  =  -27.2290008958
period_uncertainty  =  0.000377143399087
phase_cusum  =  0.306356898785
phase_eta  =  0.0723238304483
phi21  =  0.75992916793
phi31  =  1.65586155208
quartile31  =  0.405
r21  =  0.355675327561
r31  =  0.279743581661
shapiro_w  =  0.929781138897
skewness  =  -0.433072837754
slope_per10  =  -0.328762928786
slope_per90  =  0.332636370462
stetson_k  =  0.823025732031
weighted_mean  =  14.9572591993
weighted_std  =  0.246758528801
