-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.232352357511
cusum  =  0.123874135359
eta  =  0.644382697962
hl_amp_ratio  =  0.762724245861
kurtosis  =  -0.827471153786
n_points  =  253
period  =  0.60544543454
period_SNR  =  33.7580514374
period_log10FAP  =  -27.6888184431
period_uncertainty  =  0.000147535969062
phase_cusum  =  0.234180242547
phase_eta  =  0.401943725769
phi21  =  0.942685859122
phi31  =  -1.11203792871
quartile31  =  0.32
r21  =  0.44855240612
r31  =  0.264562633304
shapiro_w  =  0.960693717003
skewness  =  -0.295833477883
slope_per10  =  -0.27033487594
slope_per90  =  0.325207391338
stetson_k  =  0.845131193702
weighted_mean  =  13.5210107553
weighted_std  =  0.191158778313
