-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.287724585741
cusum  =  0.0871535292423
eta  =  0.616845371438
hl_amp_ratio  =  0.269578922468
kurtosis  =  -0.662652623042
n_points  =  281
period  =  0.549876655535
period_SNR  =  39.7265994936
period_log10FAP  =  -34.1540564826
period_uncertainty  =  0.00012124029046
phase_cusum  =  0.370706524326
phase_eta  =  0.200188742787
phi21  =  0.78169469927
phi31  =  1.77295794499
quartile31  =  0.4
r21  =  0.444359618637
r31  =  0.375544850935
shapiro_w  =  0.906090259552
skewness  =  -0.696405042491
slope_per10  =  -0.149567288838
slope_per90  =  0.214067513929
stetson_k  =  0.712279195089
weighted_mean  =  15.1726031257
weighted_std  =  0.259014426986
