-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.341983078968
cusum  =  0.129780466123
eta  =  0.601148886883
hl_amp_ratio  =  0.407820104067
kurtosis  =  -0.461312293915
n_points  =  216
period  =  0.526003320613
period_SNR  =  34.0126990754
period_log10FAP  =  -27.9481014837
period_uncertainty  =  0.000102063904098
phase_cusum  =  0.220297002114
phase_eta  =  0.232828126705
phi21  =  0.848271806877
phi31  =  1.88251511469
quartile31  =  0.42
r21  =  0.439972551963
r31  =  0.233776973836
shapiro_w  =  0.931491136551
skewness  =  -0.709848533503
slope_per10  =  -0.0886703585732
slope_per90  =  0.223400000483
stetson_k  =  0.712893214019
weighted_mean  =  15.8045077471
weighted_std  =  0.294806887651
