<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_c
class_probability =  0.81


######### Lightcurve features #########

amplitude  =  0.194752750948
cusum  =  0.0918802177887
eta  =  0.664718543088
hl_amp_ratio  =  1.30954127708
kurtosis  =  -1.01952213448
n_points  =  288
period  =  0.42498898167
period_SNR  =  38.6467108424
period_log10FAP  =  -38.9786023964
period_uncertainty  =  5.03207572452e-05
phase_cusum  =  0.239556192278
phase_eta  =  0.514444951293
phi21  =  -3.5618711675
phi31  =  -3.87756354428
quartile31  =  0.29
r21  =  0.0652904869683
r31  =  0.0307780924612
shapiro_w  =  0.960307121277
skewness  =  0.0827203290637
slope_per10  =  -0.124623892779
slope_per90  =  0.100466593071
stetson_k  =  0.849604546363
weighted_mean  =  11.8555208333
weighted_std  =  0.159492705717
</pre></body></html>