-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.26


######### Lightcurve features #########

amplitude  =  0.690913216993
cusum  =  0.24572909421
eta  =  0.761444240347
hl_amp_ratio  =  0.872290937074
kurtosis  =  -1.11955674648
n_points  =  47
period  =  0.640248609294
period_SNR  =  8.60598046465
period_log10FAP  =  -2.9430429794
period_uncertainty  =  0.000330707004691
phase_cusum  =  0.423714632708
phase_eta  =  0.45388040777
phi21  =  0.452972843952
phi31  =  0.918069370326
quartile31  =  0.835
r21  =  0.198876952644
r31  =  0.0279750661752
shapiro_w  =  0.926575779915
skewness  =  -0.349279006815
slope_per10  =  -0.271385903005
slope_per90  =  0.671450018417
stetson_k  =  0.864757290088
weighted_mean  =  11.0385106383
weighted_std  =  0.459953645784
