-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.249162245731
cusum  =  0.110488847062
eta  =  0.63752855444
hl_amp_ratio  =  0.526532968523
kurtosis  =  -0.467398127268
n_points  =  236
period  =  0.5617572617
period_SNR  =  35.5423329884
period_log10FAP  =  -30.4173267011
period_uncertainty  =  0.000135503137699
phase_cusum  =  0.268209562497
phase_eta  =  0.370676490354
phi21  =  0.667325774169
phi31  =  1.8484799459
quartile31  =  0.3825
r21  =  0.388085807966
r31  =  0.141302656917
shapiro_w  =  0.934958577156
skewness  =  -0.672973850764
slope_per10  =  -0.129812914455
slope_per90  =  0.161228364479
stetson_k  =  0.785883016211
weighted_mean  =  14.7685127762
weighted_std  =  0.236458713025
