-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.233147925488
cusum  =  0.131567650623
eta  =  0.632861893747
hl_amp_ratio  =  0.508987412022
kurtosis  =  -0.63567753083
n_points  =  235
period  =  0.525155777706
period_SNR  =  30.1603295304
period_log10FAP  =  -23.9647115933
period_uncertainty  =  0.000118453650725
phase_cusum  =  0.279109639116
phase_eta  =  0.728972194213
phi21  =  0.712572537623
phi31  =  -1.23109202874
quartile31  =  0.32
r21  =  0.286130138224
r31  =  0.257525295943
shapiro_w  =  0.941988348961
skewness  =  -0.598954323448
slope_per10  =  -0.0909445259145
slope_per90  =  0.0907880883608
stetson_k  =  0.762067660564
weighted_mean  =  15.2953051143
weighted_std  =  0.223259480631
