-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.282823393594
cusum  =  0.174454559419
eta  =  0.662043798795
hl_amp_ratio  =  0.374772977255
kurtosis  =  0.00842426213936
n_points  =  251
period  =  0.55126969372
period_SNR  =  31.3280365286
period_log10FAP  =  -26.3957381945
period_uncertainty  =  0.000147783589126
phase_cusum  =  0.199174525695
phase_eta  =  0.399945206861
phi21  =  -2.33950727211
phi31  =  -1.64151971757
quartile31  =  0.395
r21  =  0.411891113127
r31  =  0.323977750322
shapiro_w  =  0.882424414158
skewness  =  -1.00552860096
slope_per10  =  -0.106401533191
slope_per90  =  0.16751725068
stetson_k  =  0.698523357508
weighted_mean  =  15.3810150028
weighted_std  =  0.309139274522
