-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.345742243253
cusum  =  0.118311653999
eta  =  0.727092076492
hl_amp_ratio  =  0.607051164081
kurtosis  =  -0.812213498208
n_points  =  225
period  =  0.637060030574
period_SNR  =  30.2999919281
period_log10FAP  =  -23.8857259569
period_uncertainty  =  0.000174810683768
phase_cusum  =  0.243059020277
phase_eta  =  0.439847658565
phi21  =  4.06174683094
phi31  =  2.4145287504
quartile31  =  0.5
r21  =  0.328026012805
r31  =  0.327302869734
shapiro_w  =  0.942057669163
skewness  =  -0.493710178849
slope_per10  =  -0.126355494296
slope_per90  =  0.371354649778
stetson_k  =  0.834112643526
weighted_mean  =  11.4804982273
weighted_std  =  0.314868994381
