-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.321028933173
cusum  =  0.122242871589
eta  =  0.361895208495
hl_amp_ratio  =  0.352436581502
kurtosis  =  -0.620599367876
n_points  =  336
period  =  0.633085925466
period_SNR  =  42.009375209
period_log10FAP  =  -43.9093455438
period_uncertainty  =  0.000109220540949
phase_cusum  =  0.2743672212
phase_eta  =  0.0608934849669
phi21  =  -2.20252330277
phi31  =  -4.18265003291
quartile31  =  0.4
r21  =  0.518052025515
r31  =  0.304821148341
shapiro_w  =  0.898890435696
skewness  =  -0.742035134294
slope_per10  =  -0.24020247601
slope_per90  =  0.340224331486
stetson_k  =  0.716070718449
weighted_mean  =  14.2945260027
weighted_std  =  0.278885481952
