-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.314226827884
cusum  =  0.14705370011
eta  =  0.621372040634
hl_amp_ratio  =  0.35434128622
kurtosis  =  -0.0965254137951
n_points  =  259
period  =  0.494141909091
period_SNR  =  38.504179652
period_log10FAP  =  -30.2292070975
period_uncertainty  =  0.000134774153238
phase_cusum  =  0.227712859729
phase_eta  =  0.192822264135
phi21  =  -2.3362032347
phi31  =  -1.27376511417
quartile31  =  0.385
r21  =  0.458707668428
r31  =  0.367942230464
shapiro_w  =  0.889541089535
skewness  =  -0.954382282422
slope_per10  =  -0.0850826026959
slope_per90  =  0.200432736624
stetson_k  =  0.707459909173
weighted_mean  =  15.598671182
weighted_std  =  0.289898820276
