-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.28343264917
cusum  =  0.130501595173
eta  =  0.532857776507
hl_amp_ratio  =  0.629963000538
kurtosis  =  -0.84654441111
n_points  =  320
period  =  0.661689557408
period_SNR  =  40.2361774919
period_log10FAP  =  -42.4298707098
period_uncertainty  =  0.000118863544209
phase_cusum  =  0.2445760656
phase_eta  =  0.33664897248
phi21  =  -2.16931919309
phi31  =  -3.59376576387
quartile31  =  0.42
r21  =  0.355606516291
r31  =  0.216468468969
shapiro_w  =  0.956379234791
skewness  =  -0.325458752916
slope_per10  =  -0.163766668799
slope_per90  =  0.17766266252
stetson_k  =  0.839925008351
weighted_mean  =  13.0513424023
weighted_std  =  0.236018733786
