<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.78


######### Lightcurve features #########

amplitude  =  0.511771195039
cusum  =  0.376857351928
eta  =  0.26107911395
hl_amp_ratio  =  0.738710638849
kurtosis  =  -0.523781515127
n_points  =  294
period  =  0.499317799639
period_SNR  =  32.4697575124
period_log10FAP  =  -30.7811929379
period_uncertainty  =  7.03779964427e-05
phase_cusum  =  0.222116956776
phase_eta  =  0.82105732307
phi21  =  1.09203673712
phi31  =  0.0938803194605
quartile31  =  0.7275
r21  =  0.244005746412
r31  =  0.231601506066
shapiro_w  =  0.928586483002
skewness  =  -0.638203093507
slope_per10  =  -0.0186097522275
slope_per90  =  0.0349689961338
stetson_k  =  0.82181544145
weighted_mean  =  11.1491590909
weighted_std  =  0.497429275155
</pre></body></html>