-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.194068009147
cusum  =  0.163307125745
eta  =  0.793309277458
hl_amp_ratio  =  0.609749694765
kurtosis  =  -0.662131238414
n_points  =  214
period  =  0.594113107259
period_SNR  =  31.6868214632
period_log10FAP  =  -23.25942544
period_uncertainty  =  0.000193061036515
phase_cusum  =  0.23458364702
phase_eta  =  0.595332759138
phi21  =  0.889375021416
phi31  =  -1.1286685584
quartile31  =  0.27
r21  =  0.374495731136
r31  =  0.144587158303
shapiro_w  =  0.973736584187
skewness  =  -0.35414744042
slope_per10  =  -0.177800000878
slope_per90  =  0.279874158582
stetson_k  =  0.787114905968
weighted_mean  =  16.0793743775
weighted_std  =  0.17352858222
