-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.259372983775
cusum  =  0.141743471384
eta  =  0.652737047748
hl_amp_ratio  =  0.76713567372
kurtosis  =  -1.29517810528
n_points  =  157
period  =  0.665782125721
period_SNR  =  19.3565103507
period_log10FAP  =  -14.8962124388
period_uncertainty  =  0.000194770781962
phase_cusum  =  0.269813933394
phase_eta  =  0.0753897281922
phi21  =  -2.22550582844
phi31  =  -3.96376012726
quartile31  =  0.39
r21  =  0.464224439611
r31  =  0.393414418274
shapiro_w  =  0.930947065353
skewness  =  -0.207983544062
slope_per10  =  -0.26901867746
slope_per90  =  0.456367695418
stetson_k  =  0.865570672269
weighted_mean  =  14.8034572557
weighted_std  =  0.23530914618
