-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.330113536858
cusum  =  0.102095835677
eta  =  0.495898346465
hl_amp_ratio  =  0.607554785739
kurtosis  =  -0.310072939392
n_points  =  295
period  =  0.625684799918
period_SNR  =  37.3913048347
period_log10FAP  =  -38.5532891192
period_uncertainty  =  0.000106278845164
phase_cusum  =  0.235957220059
phase_eta  =  0.307214719496
phi21  =  0.931643582295
phi31  =  2.00657280466
quartile31  =  0.43
r21  =  0.347039906752
r31  =  0.212736013163
shapiro_w  =  0.937557995319
skewness  =  -0.682162307718
slope_per10  =  -0.0982703534882
slope_per90  =  0.224999998075
stetson_k  =  0.798754066177
weighted_mean  =  15.2468427366
weighted_std  =  0.273970723925
