-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.265497898437
cusum  =  0.078879415703
eta  =  0.550371595182
hl_amp_ratio  =  0.50049959899
kurtosis  =  -1.26648188279
n_points  =  370
period  =  0.644671197134
period_SNR  =  46.2528053437
period_log10FAP  =  -49.0426741692
period_uncertainty  =  0.00011321939168
phase_cusum  =  0.245464878889
phase_eta  =  0.422894660891
phi21  =  -2.24115179067
phi31  =  -0.315378800769
quartile31  =  0.45
r21  =  0.33266425065
r31  =  0.198665391308
shapiro_w  =  0.924618005753
skewness  =  -0.32006481501
slope_per10  =  -0.115191075027
slope_per90  =  0.197769780978
stetson_k  =  0.83232350255
weighted_mean  =  14.97210152
weighted_std  =  0.253762717911
