<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.54


######### Lightcurve features #########

amplitude  =  0.26877566139
cusum  =  0.130945194092
eta  =  0.602042393004
hl_amp_ratio  =  0.354957904163
kurtosis  =  -0.808306261739
n_points  =  144
period  =  0.321011738719
period_SNR  =  18.5024482211
period_log10FAP  =  -17.3710927307
period_uncertainty  =  3.16567139083e-05
phase_cusum  =  0.238273537297
phase_eta  =  0.265483416877
phi21  =  0.931309540371
phi31  =  -0.754870062151
quartile31  =  0.3725
r21  =  0.331467303906
r31  =  0.210409581638
shapiro_w  =  0.901002764702
skewness  =  -0.663318192252
slope_per10  =  -0.167266664406
slope_per90  =  0.118765058595
stetson_k  =  0.752945366591
weighted_mean  =  12.7141705607
weighted_std  =  0.219366683745
</pre></body></html>