-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.306111373246
cusum  =  0.209756122189
eta  =  0.502766337589
hl_amp_ratio  =  0.456488860708
kurtosis  =  -0.503587568933
n_points  =  104
period  =  0.652809652001
period_SNR  =  16.0098580182
period_log10FAP  =  -9.87512080426
period_uncertainty  =  0.000123802327988
phase_cusum  =  0.286644187945
phase_eta  =  0.210085029305
phi21  =  0.882718397756
phi31  =  -1.43524894508
quartile31  =  0.3425
r21  =  0.626017070398
r31  =  0.359950908524
shapiro_w  =  0.869819879532
skewness  =  -0.862500493462
slope_per10  =  -0.293335167851
slope_per90  =  0.45814999612
stetson_k  =  0.732132867253
weighted_mean  =  14.1419072228
weighted_std  =  0.293310101358
